-- MySQL dump 10.13  Distrib 8.0.34, for Win64 (x86_64)
--
-- Host: localhost    Database: jjlourens2
-- ------------------------------------------------------
-- Server version	5.5.68-MariaDB

/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!50503 SET NAMES utf8 */;
/*!40103 SET @OLD_TIME_ZONE=@@TIME_ZONE */;
/*!40103 SET TIME_ZONE='+00:00' */;
/*!40014 SET @OLD_UNIQUE_CHECKS=@@UNIQUE_CHECKS, UNIQUE_CHECKS=0 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

--
-- Table structure for table `products_solar`
--

DROP TABLE IF EXISTS `products_solar`;
/*!40101 SET @saved_cs_client     = @@character_set_client */;
/*!50503 SET character_set_client = utf8mb4 */;
CREATE TABLE `products_solar` (
  `ID` int(11) NOT NULL AUTO_INCREMENT,
  `Insurer` int(11) NOT NULL,
  `ProductCategory` varchar(255) NOT NULL,
  `Description` varchar(255) NOT NULL,
  `UnitType` varchar(40) NOT NULL,
  `DQuan` double DEFAULT '1',
  `Price` double DEFAULT NULL,
  PRIMARY KEY (`ID`),
  KEY `insurer2` (`Insurer`),
  CONSTRAINT `products_solar_ibfk_1` FOREIGN KEY (`Insurer`) REFERENCES `setup_insurer` (`pk_insurer`)
) ENGINE=InnoDB AUTO_INCREMENT=32 DEFAULT CHARSET=latin1;
/*!40101 SET character_set_client = @saved_cs_client */;

--
-- Dumping data for table `products_solar`
--

LOCK TABLES `products_solar` WRITE;
/*!40000 ALTER TABLE `products_solar` DISABLE KEYS */;
INSERT INTO `products_solar` VALUES (1,83,'Extras','Langging 15mm','',1,46),(2,83,'Extras','Copper pipe 15mm','',1,36.2),(3,83,'Extras','Copper pipe 22mm','',1,54.2),(4,83,'Extras','15mm Polycop','',1,3),(5,83,'Extras','150l Poly Tray','',1,149.75),(6,83,'Extras','200l Poly Tray','',1,150.75),(7,83,'Extras','Battons 38x38','',1,4.81),(8,83,'Extras','Planks 114x 38','',1,25.58),(9,83,'Extras','Kwikhot Vacuum breakers','',1,53.28),(10,83,'Extras','PRV - Ho Flow','',1,493.03),(11,83,'Extras','NRV','',1,99.1),(12,83,'Extras','Bonding','',1,52.5),(13,83,'Extras','Normal Isolator','',1,82.95),(14,83,'Extras','Isolator All-weather','',1,126),(15,83,'Extras','22mm Stop Cock','',1,268.46),(16,83,'Extras','15mm Stop Cock','',1,113.6),(17,83,'Extras','50mm PVC overflow','',1,9.96),(18,83,'Extras','Twin and earth wire','',1,2.5),(19,83,'Extras','Bends & Tees','',1,20),(20,83,'Extras','Scaffolding','',1,750),(21,83,'Other','Plumbing & Electrical COC','',1,1100),(22,83,'Other','Eskom Admin (JJLP does rebate)','',1,765),(23,83,'Rebate','ESKOM Rebate','',1,-6398),(24,83,'Solar units','150L Kwikhot Geyser','',1,3050.97),(25,83,'Solar units','200L Kwikhot Geyser','',1,4504.47),(26,83,'Solar units','1 x 150L System Solarmax 2.3m panel','',1,4517.36),(27,83,'Solar units','2 x 200L System Solarmax 1.6m panel','',1,6898.5),(28,83,'Solar units','Pump System 12V: System includes: 7 Day Timer, 12 V pump, Photo Voltaic panel, 2x 15mm Lever valves, 2x Deck tights, 1 x Banjo Valve, 1 x Double drain cock, 1 x Mixing valve','',1,2487),(29,83,'Solar units','Pump System 220V: System includes: 220V pump, Geysermax Conroller, 2x 22mm Lever valves, 2x Deck tights, 1 x Banjo Valve, 1 x Double drain cock, 1 x Mixing valve','',1,3805),(30,83,'Solar units','Labour & transport (existing kwikhot geyser - retrofit)','',1,2450),(31,83,'Solar units','Labour & transport (new kwikhot geyser - retrofit )','',1,3775);
/*!40000 ALTER TABLE `products_solar` ENABLE KEYS */;
UNLOCK TABLES;
/*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;

/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40014 SET UNIQUE_CHECKS=@OLD_UNIQUE_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;

-- Dump completed on 2023-10-09 19:23:06
